         180           8
  -3.49541901561386       -3.91417541733052       -4.21106140539100     
  -4.54903675515162       -4.88487606738037       -5.13561649861553     
  -5.31624306783170       -5.44613686428696     
   3.69788637745502        3.40217211343723        3.24753872914217     
   3.07343228973859        2.88715703117241        2.74342837766401     
   2.60437233542481        2.52521826600709     
 -2.880085439895047E-003  0.000000000000000E+000
  0.991773463272259       0.000000000000000E+000
  0.994930118311675       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
