         180           8
  -3.24110699859155       -3.69595310721958       -4.03781860055609     
  -4.44148356014744       -4.80470488046698       -5.09612032848332     
  -5.34224595524487       -5.43043242970299     
   4.10778673714510        3.92889160471417        3.69856843523833     
   3.38359544031720        2.99528864874247        2.74591323878916     
   2.61692120442544        2.32037034674090     
 -2.959415939236430E-003  0.000000000000000E+000
  0.991707405382623       0.000000000000000E+000
  0.995165186048758       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
