         180           8
   8.25963778835671        8.64791631736868        9.09590005497788     
   9.60191346954195        10.1465305360670        10.6466916183242     
   11.1144662268779        11.6477922397709     
   3.65334200995626        3.86175991525295        4.21127072581433     
   4.95687518507699        5.65333435082059        6.16561791730380     
   6.71985064839412        7.10998110793865     
 -2.542850762589430E-003  0.000000000000000E+000
   1.00181600605870       0.000000000000000E+000
  0.998618888138167       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
