         180           8
  -2.37700747067019       -2.58395570481115       -2.73857366363469     
  -2.85652577246271       -2.98560440915885       -3.13880427256769     
  -3.20875177193980       -3.27896295874859     
   3.60586809548601        3.75640140464200        4.02782620107762     
   4.26382711603332        4.53637952196109        4.79989290079941     
   5.05151577825018        5.27017243693844     
 -2.794429577953339E-003  0.000000000000000E+000
  0.991646994828405       0.000000000000000E+000
  0.994788877961999       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
