         180           8
  -1.22594151211980       -1.48052725871140       -1.58828272687107     
  -1.73226713995210       -1.88073403879455       -2.01166513236320     
  -2.08178991710421       -2.23463454897115     
   3.45019739951691        3.65537190019606        3.87075134069694     
   4.12519972535874        4.39778299635585        4.65090523718318     
   4.92796406778390        5.10465481210173     
 -2.810592485372389E-003  0.000000000000000E+000
  0.991720636091370       0.000000000000000E+000
  0.994800126095614       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
