         180           8
   8.19162425639788        8.61571259162099        9.15226960046624     
   9.69175212098466        10.2448096779838        10.8504341520124     
   11.4318817971484        12.1230737460262     
   4.46665006330223        4.70657522210950        4.89682650781669     
   5.10101593257597        5.26202672432248        5.47662187535922     
   5.68851941508631        5.90466417924058     
 -2.779403513499290E-003  0.000000000000000E+000
   1.00210261662991       0.000000000000000E+000
  0.998458551259239       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
