         180           8
  -1.45850869247399       -1.58227000827012       -1.69842013562360     
  -1.78703633095212       -1.91099698314768       -2.01633591472355     
  -2.08504165547871       -2.16182995924819     
   1.12829804346723        1.30916285224756        1.57384397767618     
   1.86610049464755        2.16651481904313        2.44431570917787     
   2.69701754284640        2.90718682340030     
 -3.522928591839650E-003  0.000000000000000E+000
  0.992711316496978       0.000000000000000E+000
  0.995830178792301       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
