         180           8
  -1.23625976279065       -1.52236947333951       -1.67174873515153     
  -1.79805753366438       -1.89862361150118       -1.97004990044038     
  -2.04368214886670       -2.09494300484619     
   1.25012944495899        1.37003854417046        1.59360808508784     
   1.81958825270057        2.05819513005876        2.33197211046993     
   2.57138866097196        2.85045987858844     
 -3.485845231090429E-003  0.000000000000000E+000
  0.992625244091053       0.000000000000000E+000
  0.995710080326191       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
