         180           8
   6.74682170937810        7.17148029088009        7.65726139286610     
   8.21849054879785        8.82600448550835        9.35996278247089     
   9.82585392971223        10.3364451132836     
   4.20874594163974        4.78277265632780        5.58606592330721     
   6.60252637125806        7.47941712606602        8.34686692140198     
   9.16541368234709        9.92708103162962     
 -2.878253240820809E-003  0.000000000000000E+000
   1.00202081009145       0.000000000000000E+000
  0.998797498290268       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
