         180           8
  -3.19573606452917       -3.42128496818915       -3.51396533966824     
  -3.55117129299922       -3.57966290912427       -3.65140170726753     
  -3.70889594611879       -3.74512536537363     
   1.32018337135829        1.53504433173271        2.17731072320581     
   3.04201449305677        3.74309735949138        4.42476496608442     
   5.15047247141504        5.75206468886407     
 -3.472716565906558E-003  0.000000000000000E+000
  0.992601916157960       0.000000000000000E+000
  0.995776736423478       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
