         180           8
   1.93818950126153        1.17151120537438       0.504987310208600     
 -0.169456965380608      -0.847024695331909       -1.47174676092626     
  -2.08146627005252       -2.58216680452007     
   6.60558470245266        6.91253979580484        7.10962176127093     
   7.31812631543364        7.52761308474628        7.74174773977495     
   7.98875402670530        8.15639451953164     
 -3.635667884558409E-003  0.000000000000000E+000
  0.992649708400065       0.000000000000000E+000
  0.995760559253279       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
