         180           8
   1.83213972367768        1.12029261341999       0.490523359394620     
 -0.163440459480144      -0.761645230985637       -1.29843620771828     
  -1.80691518856019       -2.36704600411960     
   3.38103651198433        3.22989620183662        3.12357558860848     
   2.98304410036653        2.92702859329089        3.28734591154595     
   3.78570320173979        4.25854938207248     
 -3.758611664331356E-003  0.000000000000000E+000
  0.992607217499400       0.000000000000000E+000
  0.995672478517765       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
