         180           8
   1.92871138044492        1.16040557862126       0.484293939673294     
 -0.141725912221550      -0.785996205615882       -1.40274806275850     
  -1.98775046077127       -2.53361121621633     
   3.27635872202606        3.10553527784953        3.02421299351018     
   2.82806125167924        2.60548950424563        2.50564445902401     
   2.45074151605155        2.29261838306767     
 -3.773056824572224E-003  0.000000000000000E+000
  0.992714233377218       0.000000000000000E+000
  0.995711395694978       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
