         180           8
   15.1250724552878        14.5899615916401        13.8961959854373     
   13.2235706689674        12.6535429536980        12.0137743117706     
   11.4116475242032        10.6594973724751     
  0.496075940563216       0.845545889644500       0.850448781347067     
  0.842612908604486       0.959769935245167        1.10308527967295     
   1.16826358213197        1.81475819813080     
 -2.654507625398834E-003  0.000000000000000E+000
   1.00273484755975       0.000000000000000E+000
  0.999245671392302       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
