         180           8
   1.95403872584920        1.40312696131660       0.671563859853046     
 -1.841789827244290E-002 -0.665247725187756       -1.27998206444007     
  -1.86109976542371       -2.44873515369107     
   3.24591154249731        3.13972484141910        2.90748445548194     
   2.67543232777570        2.50969245612496        2.28206925047367     
   2.08684533151583        2.04267319969139     
 -3.777180686654165E-003  0.000000000000000E+000
  0.992073088472112       0.000000000000000E+000
  0.995281661161601       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
