         180           8
   1.97592745336658        1.36005222810160       0.655469941114446     
  1.513724315534534E-002 -0.577312595529427       -1.14320388371299     
  -1.75590340072895       -2.23472180427709     
   2.87144064519445        2.86100450873896        2.79368723190645     
   2.64871777901984        2.49115894735993        2.26921519852128     
   2.13960202164967        2.06087698090504     
 -3.839761929546527E-003  0.000000000000000E+000
  0.992507853123315       0.000000000000000E+000
  0.995844757679021       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
