         180           8
   2.63028515162658        1.92469606621979        1.26072411489481     
  0.553242636623673      -3.313180356971421E-002 -0.658419550225193     
  -1.33753774560191       -1.95937667810047     
   7.27931650714136        7.52367603523141        7.74184687278526     
   7.98866802676529        8.17504680519509        8.30492235084647     
   8.44199979890274        8.80039619859051     
 -3.915118985765499E-003  0.000000000000000E+000
  0.992602855489787       0.000000000000000E+000
  0.995864319764078       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
