         180           8
   2.46369452592202        1.79785222915625        1.16408307326316     
  0.546221375111193      -8.707724449721650E-002 -0.689370908437000     
  -1.26021083149417       -1.86655216133543     
   3.78777377758458        4.23326272473115        4.57533964115816     
   4.85954802747904        5.13942970879890        5.31472310437836     
   5.49824880059364        5.81257282648747     
 -3.959233794626744E-003  0.000000000000000E+000
  0.992789949672430       0.000000000000000E+000
  0.995936651095346       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
