         180           8
   15.5590033936694        14.7334205198403        14.2063345057347     
   13.5792233625403        12.9091048073292        12.2419633601506     
   11.6220848857610        11.0468717502508     
  0.608806849360381       0.878258697275775       0.905671396869597     
   1.09785710917787        1.26187408731284        1.30715708821452     
   1.35040990155733        1.46653238419714     
 -2.653239737941188E-003  0.000000000000000E+000
   1.00263120673322       0.000000000000000E+000
  0.999509702377650       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
