         180           8
   2.73825102480809        2.08132853679542        1.35843118189567     
  0.677268837754054       4.845001591285830E-002 -0.536255144187242     
  -1.19215479538080       -1.80475019658401     
   2.79092437987515        2.71926704166423        2.56944839786788     
   2.42442666261621        2.27589603544244        2.07106457721215     
   1.79909575525043        1.64804151895663     
 -4.067271500882997E-003  0.000000000000000E+000
  0.992580325489025       0.000000000000000E+000
  0.995868864778643       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
