         180           8
   3.01102330769260        2.45774054941753        1.83095363602736     
   1.20359811183289       0.579069261905259      -4.126928335022431E-002
 -0.637505548524779       -1.23595042586405     
   2.69876883412497        3.32819360285190        3.78263845640418     
   4.16797944331466        4.50957914864561        4.77648610160690     
   4.98618274230613        5.11971164187143     
 -4.257524129403637E-003  0.000000000000000E+000
  0.993367635235641       0.000000000000000E+000
  0.996739746466291       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
