         180           8
 -0.826094913604295       -1.23217210069890       -1.58685238849774     
  -1.96708438605285       -2.34812928678505       -2.66047918384113     
  -2.93700574303618       -3.09167799665428     
  -1.16043971848565       -1.60344142861794       -1.87500872792988     
  -2.11878381377014       -2.37025306525442       -2.58920983307565     
  -2.73031723536408       -3.05262856527178     
 -4.068679483522188E-003  0.000000000000000E+000
  0.993220013669162       0.000000000000000E+000
  0.996711558259962       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
