         180           8
   3.30343936951174        2.63729180833386        1.99266589810196     
   1.33285112783936       0.726926677922562       0.128592108439885     
 -0.493666801740629       -1.09902060194436     
   1.89957445846735        1.68517056250862        1.64601461652343     
   1.54710599358518        1.49224081425271        1.34797137393467     
   1.16470510201761       0.990411989259912     
 -4.289473667801933E-003  0.000000000000000E+000
  0.993483836153640       0.000000000000000E+000
  0.996984434327466       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
