         180           8
  0.109683219489973      -8.750677116596343E-002 -0.202857323217023     
 -0.291703570855895      -0.385151325067988      -0.446615617279409     
 -0.386007940681061      -0.431560686037929     
  -1.35037967145847       -1.21386699838108      -0.939468196530141     
 -0.653372425899244      -0.430112120450962      -9.055347305685538E-002
  0.682971801937522        1.60048147920515     
 -4.099973340951023E-003  0.000000000000000E+000
  0.993433347679207       0.000000000000000E+000
  0.997120409634572       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
