         180           8
  0.148749554947051      -3.393225525523133E-002 -0.149005406330328     
 -0.252907062637812      -0.338870557414197      -0.413827931014045     
 -0.451055153352422      -0.504852236738753     
  -1.30109363498308       -1.18666796320781      -0.945656888952556     
 -0.691212518330179      -0.413903188163456      -0.149458464350674     
  7.217983508579405E-002  0.340949308161233     
 -4.073266404790187E-003  0.000000000000000E+000
  0.993452018837356       0.000000000000000E+000
  0.996975902443070       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
