         180           8
  2.879479020292714E-002 -7.648066340921887E-002 -0.234559714051653     
 -0.336295659128833      -0.406933934080910      -0.498723176456347     
 -0.563506170247591      -0.604052976727420     
  -1.30087997217717       -1.17332811755708      -0.907468496593470     
 -0.645522059736410      -0.381257664810351      -0.107810012295256     
  0.114230962372260       0.437786812946249     
 -4.058258319552986E-003  0.000000000000000E+000
  0.993487840918414       0.000000000000000E+000
  0.996921533319204       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
