         180           8
 -0.169586982810589      -0.287031816570163      -0.428583134564060     
 -0.550121267282714      -0.638907511378316      -0.693515781197238     
 -0.761758002640604      -0.803190934343215     
  -1.01252963444513      -0.907742176471554      -0.694561076312076     
 -0.484523607599024      -0.266207857652182      -2.014086473414023E-002
  0.204770052228974       0.526923512347032     
 -4.094162456234498E-003  0.000000000000000E+000
  0.993462978416805       0.000000000000000E+000
  0.997113603531245       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
