         180           8
   7.09706920810348        7.37103580516723        7.83522806716660     
   8.30821184125341        8.85650858002386        9.43778038033549     
   9.98173522703195        10.6038195292507     
 -0.154426523259619      -0.168640898513127      -5.595545821541334E-002
  3.225070364198010E-002  0.135085426251731       0.296661251705384     
  0.511531597164894       0.728768961859446     
 -2.632902358260818E-003  0.000000000000000E+000
   1.00240571239039       0.000000000000000E+000
  0.999623025397003       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
