         180           8
 -4.898430773824988E-002 -0.339844233662092      -0.486626647146443     
 -0.634541983701470      -0.676956070526140      -0.712819273943091     
 -0.798257877542590      -0.861529265853523     
 -0.503295656017962      -0.415176242409135      -0.231212405144173     
 -5.187350892585870E-002  0.147498518089054       0.370389862207348     
  0.591741898199949       0.869952615962394     
 -4.053225010901443E-003  0.000000000000000E+000
  0.993709570990184       0.000000000000000E+000
  0.996881704030041       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
