         180           8
   2.40757125285638        1.76085802247751        1.08068686171918     
  0.413358682093554      -0.213249356943357      -0.801226637312025     
  -1.38203153753418       -1.97952399021370     
   3.12396107153337        3.06622004675592        2.89603379949338     
   2.76593248636221        2.63075511204725        2.40569677756501     
   2.21121349764459        2.20502206220687     
 -3.966849177014679E-003  0.000000000000000E+000
  0.992896453291364       0.000000000000000E+000
  0.996262316975934       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
