         180           8
   2.30743080432739        1.67406247158735        1.05471080934872     
  0.409800337590310      -0.251996475420453      -0.871057328514672     
  -1.46099671627977       -1.96982126233701     
   3.10270639267748        3.05913312409388        2.91155304189650     
   2.76303260611942        2.63344149086946        2.37240119235394     
   2.16547891066136        2.11949578053416     
 -3.967734333784661E-003  0.000000000000000E+000
  0.992976212816708       0.000000000000000E+000
  0.996239482949713       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
