         180           8
   14.8538398610881        14.2563317135919        13.6712793415565     
   13.0485270106553        12.4269391480646        11.8268612737912     
   11.2440005971091        10.6955890943728     
  0.847620047488558        1.03684053356903        1.14424999923414     
   1.13355074724949        1.31347116073129        1.60111698579098     
   1.80598144042225        2.11789621934820     
 -2.676001332062577E-003  0.000000000000000E+000
   1.00252745165728       0.000000000000000E+000
  0.999660812102186       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
