         180           8
   2.23706248770130        1.51890436860112       0.904065124498705     
  0.239050635658497      -0.411280483515362       -1.02276373038281     
  -1.58587435853614       -2.18481077111721     
   3.38859568151408        3.27833830675253        3.16140132212328     
   2.89838825515235        2.71832691946952        2.62100165377224     
   2.48654130745216        2.39813466362892     
 -3.974902976826856E-003  0.000000000000000E+000
  0.993287695031730       0.000000000000000E+000
  0.996625106455560       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
