         180           8
   1.84921023785984        1.17215292525970       0.517230034570527     
 -0.158180901474052      -0.779995419420164       -1.36046290378129     
  -1.97380259613878       -2.44954550367440     
   3.34914042642176        3.27573036243476        3.13346559505783     
   2.96114219054628        2.81588682405106        2.70142072463085     
   2.59902655150082        2.54238797049076     
 -3.726292043377064E-003  0.000000000000000E+000
  0.992421676402393       0.000000000000000E+000
  0.995635560090033       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
