         180           8
   1.75854254427624        1.18601443190752       0.510454999730839     
 -0.133876911262108      -0.725411752073566       -1.35144442287498     
  -1.98478918703846       -2.46608094842375     
   3.41865062459316        3.35513010107857        3.22416961953816     
   3.06007743113771        2.88059957713383        2.65209539585476     
   2.47777451552124        2.32150821397421     
 -3.769015989425184E-003  0.000000000000000E+000
  0.992613531487733       0.000000000000000E+000
  0.995733846288172       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
