         180           8
   2.46135685991025        1.62933923411753       0.903509161321454     
  0.208224890250486      -0.434596866853265       -1.04037702723437     
  -1.57049411122402       -2.01580189074467     
   2.87514284590077        2.71821203746631        2.55089351186144     
   2.40610290834754        2.32506133866421        2.19638803283289     
   2.02762044173251        1.98769518981388     
 -4.025050607271381E-003  0.000000000000000E+000
  0.993321872232337       0.000000000000000E+000
  0.996543492185607       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
