         180           8
   1.95010116055802        1.23103548098994       0.603447276662514     
  4.006821650366001E-003 -0.632029330706632       -1.24983214943463     
  -1.80566012320888       -2.36853209342280     
   3.00087636015064        2.89587886240156        2.77478660400036     
   2.59048152907179        2.46008278026362        2.29665177329356     
   2.09336502679160        1.75368094489047     
 -3.924905644290260E-003  0.000000000000000E+000
  0.993173680356785       0.000000000000000E+000
  0.996242547736510       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
