         180           8
   2.19024124273072        1.41559026549703       0.731230964850326     
  5.638396721909892E-002 -0.534463104344300       -1.14091530792880     
  -1.71108348468003       -2.20460448652163     
   2.53885960156971        2.53483855890545        2.53734308364041     
   2.50431473958231        2.43081162389466        2.30178536674210     
   2.16034581712384        2.00163578141729     
 -4.024836735580459E-003  0.000000000000000E+000
  0.993502783468672       0.000000000000000E+000
  0.996620799794056       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
