         180           8
   2.84414380308798        2.17903453419642        1.49364097541914     
  0.829015100237636       0.239177471846716      -0.317072281961694     
 -0.850182131646409       -1.38576327741764     
   3.08774619224254        3.17118276173992        3.13588608165727     
   3.06319248783151        3.08776524420381        3.46586871692680     
   3.85616363258739        4.11856361076578     
 -3.911427817489203E-003  0.000000000000000E+000
  0.993036698086815       0.000000000000000E+000
  0.996292055662457       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
