         180           8
 -0.853878668526493      -0.975453306053225       -1.12752190939524     
  -1.25072366798267       -1.31354668627527       -1.34092305333043     
  -1.38445498890136       -1.54730856596759     
 -0.430681677680629      -0.302302565397632      -5.898264727067741E-002
  0.195907705446045       0.785291062861315        1.60586414626078     
   2.33415049299505        3.19526719542943     
 -3.524027610443253E-003  0.000000000000000E+000
  0.992630052195826       0.000000000000000E+000
  0.995969558298835       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
