         180           8
 -0.727035797283181      -0.887977478135701       -1.03845258356291     
  -1.18149746040744       -1.27126792022882       -1.32104574481912     
  -1.39422308088403       -1.47506158275794     
 -0.570836769601332      -0.386845153636737      -0.107547431870166     
  0.173014125179657       0.434109051992645       0.676714002787793     
  0.908217800857252        1.18115352051038     
 -3.555481817715955E-003  0.000000000000000E+000
  0.992892749415601       0.000000000000000E+000
  0.996001132151609       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
