         180           8
 -0.565133606929430      -0.691757133663556      -0.851475992006919     
  -1.01070470094450       -1.13162426232736       -1.24619832555314     
  -1.30701165860260       -1.48085719892804     
 -0.180142024498410      -5.224356557813304E-002  0.136401510720141     
  0.376760962961639       0.599165702362745       0.784063261520486     
   1.00077200415284        1.19749592155898     
 -3.704663526855257E-003  0.000000000000000E+000
  0.993316905258687       0.000000000000000E+000
  0.996322532897985       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
