         180           8
   1.84379176846965        1.29649862555350       0.630597128156696     
  9.336917234509459E-003 -0.581415646829367       -1.13473208363767     
  -1.75568950026799       -2.27236243056784     
   3.14107377397188        3.07617799253750        3.00720243401389     
   2.84772027485193        2.87137694666377        3.21347933188324     
   3.56725845206299        3.87687999650658     
 -3.719784402001358E-003  0.000000000000000E+000
  0.992607713934638       0.000000000000000E+000
  0.995477825944836       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
