         180           8
   1.91717202999471        1.29001205542146       0.609884850041749     
 -2.389037100711478E-002 -0.606045774990227       -1.21571223968494     
  -1.81262559671935       -2.34516480500205     
   3.10598904013623        2.99233961279629        2.93549830491346     
   2.79943130713844        2.63055348349325        2.45855818853498     
   2.26562213384798        2.01749257545146     
 -3.716231277995608E-003  0.000000000000000E+000
  0.992608351669778       0.000000000000000E+000
  0.995518380328848       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
