         180           3
   15.8020221091367        13.7217970201633        11.5918297108464     
   1.11949945192851        1.72450167206631        2.04521552582781     
 -2.690873349304533E-003  0.000000000000000E+000
   1.00235032378506       0.000000000000000E+000
  0.998869628992489       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
