         180           8
   1.82089963323922        1.18248838452674       0.571091797731304     
 -5.097112539842601E-002 -0.648960964961393       -1.27422093604723     
  -1.87266409766488       -2.37316820708742     
   2.87415556907881        2.74465852272400        2.73835251961125     
   2.59391745790989        2.46972019818243        2.29126718216489     
   2.08930985734292        1.96361129841850     
 -3.764187466919157E-003  0.000000000000000E+000
  0.992866098135482       0.000000000000000E+000
  0.995623940357065       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
