         180           8
  -5.37776196832052       -5.61978400726420       -5.94949149238728     
  -6.21414913376222       -6.49417020625096       -6.72484127568340     
  -6.89058983292017       -7.04417516811810     
  7.487662847657718E-002  4.674229997098090E-002 -7.620233580145674E-002
 -0.282164136243424      -0.661586322308982      -0.873056315340122     
 -0.821126690583696      -0.988283695019661     
 -3.809796219949846E-003  0.000000000000000E+000
  0.992778828944799       0.000000000000000E+000
  0.995852385849834       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
