         180           8
  -1.03985613022978       -1.25968572434971       -1.39221577501831     
  -1.46714423100897       -1.46926089100965       -1.50889941063209     
  -1.59265929421858       -1.68006300143397     
 -0.335386561012855      -2.598773291505886E-002  0.251365685844965     
  0.943517822379494        1.86052106519099        2.60235745416845     
   3.29978453634841        4.06768604382495     
 -3.411533489753953E-003  0.000000000000000E+000
  0.992572197068605       0.000000000000000E+000
  0.995695547496074       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
