         180           3
   8.05027504579660        9.69682837365054        11.6183228126180     
  0.287024519877466       0.917683585062728        1.62787628948900     
 -2.643693974028555E-003  0.000000000000000E+000
   1.00197498310017       0.000000000000000E+000
  0.998635930259471       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
