         180           8
  -1.02603778775128       -1.21218520914631       -1.35932943493400     
  -1.45016065182856       -1.53172613295585       -1.59224863724091     
  -1.67054962895293       -1.79460126177819     
 -0.505487434937494      -0.329593534082834      -8.348160251952261E-002
  0.173417078960613       0.419593932652067       0.677292047530972     
  0.961001428500952        1.23664847114226     
 -3.446252363778061E-003  0.000000000000000E+000
  0.992340933612966       0.000000000000000E+000
  0.995548384897033       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
